merged with the moraic form |V| in the current analysis. The

Syllabic Duration (ms)

Count

Moraic Duration (ms)

(a)

(b)

0

50

100

0 100 200 300 400 500

0

50

100 150

0 100 200 300 400 500

0 5 10 15 20 0.2 0.4 0.6 0.8 1

Modulation Frequency (Hz)

Modulation Energy

Modulation Spectrum for 1 - 2 kHz 0 5 10 15 20 0 100

Count

1/Syllable Duration (equiv. mod. freq.)

intrinsic phonological structure.

Count

0

50

100

0 5 10 15 20

1/Syllable Duration

(equiv. mod. freq.)

0.3

0.4

0.5

Modulation Frequency (Hz)

Modulation Energy

Modulation Spectrum for 1 - 2 kHz

0 5 10 15 20

Previous Moraic Duration [ms]

Current Moraic Duration [ms]

Previous Syllabic Duration [ms]

Current Syllabic Duration [ms]

(a)

(b)